CREATE DATABASE IF NOT EXISTS `openager` DEFAULT CHARACTER SET utf8 COLLATE utf8_general_ci;
USE `openager`;

-- --------------------------------------------------------

--
-- Tabellenstruktur für Tabelle `sensor_aggr`
--

CREATE TABLE IF NOT EXISTS `sensor_aggr` (
  `epoch` bigint(20) NOT NULL,
  `device` varchar(255) NOT NULL,
  `sensor` varchar(255) NOT NULL,
  `value` double NOT NULL,
  PRIMARY KEY (`epoch`,`device`,`sensor`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

-- --------------------------------------------------------

--
-- Tabellenstruktur für Tabelle `sensor_data`
--

CREATE TABLE IF NOT EXISTS `sensor_data` (
  `id` bigint(20) NOT NULL AUTO_INCREMENT,
  `device` text NOT NULL,
  `sensor` text NOT NULL,
  `value` double NOT NULL,
  `epoch` bigint(20) NOT NULL,
  `timestamp` timestamp NOT NULL DEFAULT current_timestamp(),
  PRIMARY KEY (`id`),
  KEY `sensor_data_idx1` (`timestamp`),
  KEY `sensor_data_idx2` (`epoch`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;